Title: ICND1 / Show Commands

Q: Which command produced the following output:
Global values:
  Internet Protocol routing is enabled
FastEthernet0/0 is up, line protocol is up
  Internet address is 172.16.0.1/24
FastEthernet0/1 is administratively down, line protocol is down
Serial0/0/0 is up, line protocol is up
  Internet address is 10.0.0.1/30
Serial0/1/0 is up, line protocol is up
  Internet address is 10.0.0.14/30
A: show protocols

Q: What command could you use to see if IP routing is enabled or not?
A: Router#show protocols
Global values:
  Internet Protocol routing is enabled
FastEthernet0/0 is up, line protocol is down
FastEthernet0/1 is administratively down, line protocol is down
Vlan1 is administratively down, line protocol is down

Q: Which command produced the following output?:
% Key pair was generated at: 00:34:45 UTC Dec 11 2015
Key name: R3.null.local
Key type: RSA KEYS
 Storage Device: not specified
 Usage: General Purpose Key
 Key is not exportable.
 Key Data:
  30819F30 0D06092A 864886F7 0D010101 05000381 8D003081 89028181 00B8B50F
  1B838D01 1186E332 8371777A 68874611 455A15C6 4F170237 DAE1B27F 7DF290EC
  22334EF1 106E23A9 6563A376 9C595F50 4D76422F 4EBCC63F A625D5A1 C2DDD246
  A3EE1DB1 DBC1479E 71F9EF61 3DF53688 18545ACC 79205192 96D1499F 3BA8F663
  72B159CC CEE6EBF0 0272702C 14A09559 A4B08A6D F6B6723C 4B539F4A 03020301 0001
% Key pair was generated at: 00:34:48 UTC Dec 11 2015
Key name: R3.null.local.server
Key type: RSA KEYS
Temporary key
 Usage: Encryption Key
 Key is not exportable.
 Key Data:
  307C300D 06092A86 4886F70D 01010105 00036B00 30680261 00ABB849 FD23FD72
  52142D77 9C8769C5 E72AB3C6 E77F59B4 521F91DD E8370734 97EE2165 31B9BD18
  35DE29F4 11F7D3B9 5AC8125B 7010AD98 8AE0A07E 9EFE868C 3C157DFE 3E0AB13B
  CECA294B 9D693B1A 7060CF5D D46B96FB 5B18EA48 F015FA21 BF020301 0001
A: show crypto key mypubkey rsa

Q: What command produced the following output?:
SSH Enabled - version 1.99
Authentication timeout: 120 secs; Authentication retries: 3
Minimum expected Diffie Hellman key size : 1024 bits
IOS Keys in SECSH format(ssh-rsa, base64 encoded):
ssh-rsa AAAAB3NzaC1yc2EAAAADAQABAAAAgQC4tQ8bg40BEYbjMoNxd3poh0YRRVoVxk8XAjfa4bJ/
ffKQ7CIzTvEQbiOpZWOjdpxZX1BNdkIvTrzGP6Yl1aHC3dJGo+4dsdvBR55x+e9hPfU2iBhUWsx5IFGS
ltFJnzuo9mNysVnMzubr8AJycCwUoJVZpLCKbfa2cjxLU59KAw==
A: show ip ssh

Q: What command produced the following output?:
FastEthernet0/0 is up, line protocol is up
  Hardware is Gt96k FE, address is 001f.9ec9.99fe (bia 001f.9ec9.99fe)
  MTU 1500 bytes, BW 100000 Kbit/sec, DLY 100 usec,
     reliability 255/255, txload 1/255, rxload 1/255
  Encapsulation ARPA, loopback not set
  Keepalive set (10 sec)
  Full-duplex, 100Mb/s, 100BaseTX/FX
  ARP type: ARPA, ARP Timeout 04:00:00
  Last input 00:00:00, output 00:00:04, output hang never
  Last clearing of "show interface" counters never
  Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0
  Queueing strategy: fifo
  Output queue: 0/40 (size/max)
  5 minute input rate 0 bits/sec, 0 packets/sec
  5 minute output rate 0 bits/sec, 0 packets/sec
     8232 packets input, 1726567 bytes
     Received 3706 broadcasts (0 IP multicasts)
     0 runts, 0 giants, 0 throttles
     0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored
     0 watchdog
     0 input packets with dribble condition detected
     12784 packets output, 2098612 bytes, 0 underruns
     0 output errors, 0 collisions, 2 interface resets
     2311 unknown protocol drops
     0 babbles, 0 late collision, 0 deferred
     0 lost carrier, 0 no carrier
     0 output buffer failures, 0 output buffers swapped out
FastEthernet0/1 is administratively down, line protocol is down
  Hardware is Gt96k FE, address is 001f.9ec9.99ff (bia 001f.9ec9.99ff)
  MTU 1500 bytes, BW 100000 Kbit/sec, DLY 100 usec,
     reliability 255/255, txload 1/255, rxload 1/255
  Encapsulation ARPA, loopback not set
  Keepalive set (10 sec)
  Auto-duplex, Auto Speed, 100BaseTX/FX
  ARP type: ARPA, ARP Timeout 04:00:00
  Last input never, output never, output hang never
  Last clearing of "show interface" counters never
  Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0
  Queueing strategy: fifo
  Output queue: 0/40 (size/max)
  5 minute input rate 0 bits/sec, 0 packets/sec
  5 minute output rate 0 bits/sec, 0 packets/sec
     0 packets input, 0 bytes
     Received 0 broadcasts (0 IP multicasts)
     0 runts, 0 giants, 0 throttles
     0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored
     0 watchdog
     0 input packets with dribble condition detected
     0 packets output, 0 bytes, 0 underruns
     0 output errors, 0 collisions, 0 interface resets
     0 unknown protocol drops
     0 babbles, 0 late collision, 0 deferred
     0 lost carrier, 0 no carrier
     0 output buffer failures, 0 output buffers swapped out
.....
A: R1#show interfaces

Q: What command produced the following output?:
Stored system POST messages:
POST: CPU Buffer Tests : Begin
POST: CPU Buffer Tests : End, Status Passed
POST: CPU Interface Tests : Begin
POST: CPU Interface Tests : End, Status Passed
POST: Switch Core Tests : Begin
POST: Switch Core Tests : End, Status Passed
POST: CPU Interface 2nd Stage Tests : Begin
POST: CPU Interface 2nd Stage Tests : End, Status Passed
POST: CAM Subsystem Tests : Begin
POST: CAM Subsystem Tests : End, Status Passed
POST: Ethernet Controller Tests : Begin
POST: Ethernet
*Mar  1 00:20:20.959: %SYS-5-CONFIG_I: Configured from console by consoleController Tests : End, Status Passed
POST: Loopback Tests : Begin
POST: Loopback Tests : End, Status Passed
A: SW1#show post